120000 121000 122000 123000 124000 125000 126000 127000 128000 129000 130000 131000 132000 133000 134000 135000 136000 137000 138000 139000 140000

Flux Spacing

0 1000

2000

3000

4000

5000

6000

7000

8000

9000

10000

11000

12000

120000 121000 122000 123000 124000 125000 126000 127000 128000 129000 130000 131000 132000 133000 134000 135000 136000 137000 138000 139000 140000

PLL Clock

3600

3700

3800

3900

4000

4100

4200

4300

4400

120000 121000 122000 123000 124000 125000 126000 127000 128000 129000 130000 131000 132000 133000 134000 135000 136000 137000 138000 139000 140000

Track Layout

7 GAP3 DATA for Sector 7 Position=121543 Length=16506 Avg Clock=4.01 GAP4